118 3. Mott Metal-Insulator Transition in the d → ∞ Hubbard Model

Figure 3.38: Double occupancy for T = 1/25, analogous to Fig. 3.37.

Figure 3.39: Double occupancy for T = 1/32, analogous to Fig. 3.37. For U = 4.85, where the quality of a purely quadratic least-squares fit for D in the metallic phase (upper solid circle) is already bad, a fit including a linear term has been added (lower solid circle). Both estimates bracket the fit functions for Δτ = 0.0 (double-dashed lines).