3.8. Spectra 167

Figure 3.75: QMC estimates of the imaginary-time Green function for T = 1/20 and Δτ = 0.1.

Figure 3.76: QMC estimates of the imaginary-time Green function for T = 1/15 and Δτ = 0.1.