168 3. Mott Metal-Insulator Transition in the d → ∞ Hubbard Model

Figure 3.77: Local spectral function of the half-filled Hubbard model with semi-elliptic DOS for d → ∞ in the paramagnetic metallic phase at T = 0.05: QMC/MEM result for Δτ = 0.1 using a flat default model. Inset: integrated spectral weights.

Figure 3.78: Local spectral function of the half-filled Hubbard model with semi-elliptic DOS for d → ∞ in the paramagnetic metallic phase at T = 0.05: QMC/MEM result for Δτ = 0.1 using a narrow default model. Inset: integrated spectral weights.