Figure C.4: Imaginary part of the self-energy Σ(iω_n) for T = 0.1 and U = 4.0 computed using Ulmke’s smoothing scheme for various values of Δτ. Inset: Computed ω_n Im Σ(iω_n) in comparison with the exact asymptotic value -4.

Figure C.5: Imaginary part of the self-energy Σ(iω_n) for T = 0.1 and U = 5.0 computed using Ulmke’s smoothing scheme for various values of Δτ. Inset: Computed ω_n Im Σ(iω_n) in comparison with the exact asymptotic value -6.25.