302 C. Fourier-Transforming Imaginary-Time Green Functions

Figure C.6: Imaginary part of the self-energy Σ(iω_n) for T = 0.1 and U = 4.0 resulting from the QMC code used throughout chapter 3 for various values of Δτ. Inset: Computed ω_n Im Σ(iω_n) in comparison with the exact asymptotic value -4.

Figure C.7: Imaginary part of the self-energy Σ(iω_n) for T = 0.1 and U = 5.0 resulting from the QMC code used throughout chapter 3 for various values of Δτ. Inset: Computed ω_n Im Σ(iω_n) in comparison with the exact asymptotic value -6.25.